\input output
\input defs
\input fontsize
\font\rm=hand \rm
\raggedright
\parskip=24pt

Jim Balderson,

re: The Denver Boot -- So ``anarchists'' will dismantle the Boot�
from cars in the city?  An ignorant, reactionary and dangerous�
choice of words. Dangerous, because anarchist people like myself�
are specifically harassed by the police exactly because of idiots�
who say ``anarchist'' to add spice to their writing. Hint: it's�
rude as shit to use any group or label for such purposes.

Take a look at what anarchists really do in this city. They work�
for youth shelters and crisis lines. Distribute free food to�
those who need it. The needle exchange. Any number of�
understaffed and 
under- or un-paid help volunteers that make S.F. a good city to�
live in. Sorry, but you've got no excuse. It was wise-ass remark,�
at our expense. 

And a personal no-thanks from me for increasing the�
harassment/\break irritation level in my life. Jerk.


{\obeylines\parskip=0pt
Tom Jennings
164 Shipley
San Francisco CA 94107
882-9832
}

PS: This doesn't mean I think dismantling them is a bad idea\dots

\bye
